237.51-4 RA 07 20 07.35301 DEC -24 02 41.3999 237.51-4.84.ICL001.1

Plot file version 1 created 26-NOV-2009 11:46:34

Average over area in X: 106 106 in Y: 88 88

MilliJY/BEAM

Kilo VELO-LSR

-10 0 10 20 30 40 50

500

400

300

200

100

0

-100

-200

-300