147.84+1 RA 03 58 20.23818 DEC 54 40 19.1996 147.84+1.09.ICL001.2

Plot file version 1 created 25-NOV-2009 08:57:31

Average over area in X: 106 106 in Y: 214 214

MilliJY/BEAM

Kilo VELO-LSR

-30 -20 -10 0 10 20 30

300

250

200

150

100

50

0

-50

-100