116.30+0 RA 23 53 14.19545 DEC 62 42 12.7858 116.30+0.58.ICL001.1

Plot file version 1 created 02-DEC-2009 10:07:21

Average over area in X: 18 18 in Y: 198 198

MilliJY/BEAM

Kilo VELO-LSR

-30 -20 -10 0 10 20 30

150

100

50

0

-50

-100