111.25-0 RA 23 16 10.31864 DEC 59 55 28.7999 111.25-0.77.ICL001.1

Plot file version 1 created 02-DEC-2009 10:05:54

Average over area in X: 119 119 in Y: 129 129

JY/BEAM

Kilo VELO-LSR

-90 -80 -70 -60 -50 -40 -30

12

10

8

6

4

2

0