108.92+2 RA 22 47 09.27792 DEC 62 01 32.1849 108.92+2.59.ICL001.1

Plot file version 1 created 02-DEC-2009 09:59:59

Average over area in X: 243 243 in Y: 78 78

MilliJY/BEAM

Kilo VELO-LSR

-20 -10 0 10 20 30 40

140 120

100

80

60

40

20

0 -20

-40

-60