097.34+3 RA 21 30 49.61707 DEC 55 48 53.6973 097.34+3.25.ICL001.3

Plot file version 3 created 03-DEC-2009 16:41:44

Average over area in X: 183 183 in Y: 126 126

MilliJY/BEAM

Kilo VELO-LSR

-100 -90 -80 -70 -60 -50 -40

400

300

200

100

0

-100

-200