071.31+0 RA 20 07 31.28877 DEC 33 59 42.2000 071.31+0.83.ICL001.3

Plot file version 3 created 03-DEC-2009 16:41:30

Average over area in X: 134 134 in Y: 136 136

JY/BEAM

Kilo VELO-LSR

-20 -10 0 10 20 30 40

4.0

3.5

3.0

2.5

2.0

1.5

1.0

0.5

0.0