025.38-0 RA 18 38 14.63926 DEC -06 47 58.8000 025.38-0.18.ICL001.1

Plot file version 1 created 27-NOV-2009 20:51:52

Average over area in X: 117 117 in Y: 106 106

JY/BEAM

Kilo VELO-LSR

40 50 60 70 80 90 100

120

100

80

60

40

20

0