Plot file version 80 created 04-DEC-2009 17:45:49 053.18+0 20091013.LINE.1 Freq = 22.2324 GHz, Bw = 6.250 MH Calibrated with CL # 2 and BP # 1 (BP mode 1)

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

-10 0 10 20 30 40 50

3.2 3.1 3.0 2.9 2.8 2.7 2.6 2.5 IF 1(RR)