2000 3000 4000 5000 6000 7000 -16 -15.5 -15 -14.5

2000 3000 4000 5000 6000 7000 -16 -15.5 -15 -14.5 -14

2000 3000 4000 5000 6000 7000

-16

-15

-14

2000 3000 4000 5000 6000 7000

-16

-15

-14