3000 3200 3400 3600 3800 4000 4200 4400 4600 4800 0

.05

.1

.15

.2

.25

.3

.35 Atmospheric Extinction for z

Julian Date - 2450000

2004 2005 2006 2007 2008

Magnitudes per Airmass